<template>
    <div class="grid grid-cols-2 items-start gap-y-8 gap-x-40 mb-16">
        <UiSkeletonBlock height="48px"/>
        <div class="flex flex-col gap-2" v-for="i in 9">
            <UiSkeletonBlock width="96px"/>
            <UiSkeletonBlock width="100%" height="42px"/>
        </div>
    </div>
    <div class="flex justify-center">
        <UiSkeletonBlock
            width="272px"
            height="50px"
        />
    </div>
</template>
<script setup lang="ts">
</script>
